LOG RLIGHT VS LOG NEL

runs 3215-3239, 5ΛcthetaΛ15^o

1.5

1.55

1.6

1.65

1.7

1.75

1.8

1.85

1.9

1.95

2

4 4.5 5 5.5 6 6.5

ID Entries Mean RMS

71 126039 5.245 0.7054

96/05/13 12.30

paw average real data

MC proton

MC iron